Extended Stay America Premier Suites: Exploring Accommodation Options Near Tampa’s Attractions

Nestled in Tampa, the Extended Stay America Premier Suites offers accessibility and convenience for travelers, situated just 11 kilometers from Busch Gardens and 12 kilometers from Adventure Island. Many guests have praised its location and the quality of service provided.

The hotel boasts a variety of amenities aimed at enhancing the guest experience. Featuring a fitness center, air-conditioned rooms with private bathrooms, and complimentary Wi-Fi, it caters to a broad range of preferences. Many guests appreciate the non-smoking environment, adding to its appeal.

An array of room options is available, including studios with large and extra-large beds, which provide ample space and comfort. Each room is equipped with a kitchen area complete with a refrigerator, ensuring that guests have the option to prepare their meals during their stay.

Visitors have frequently highlighted the hotel’s cleanliness and friendliness of the staff. Comments from past guests include Marielle from Puerto Rico, who described the hotel as clean with spacious rooms, and Daria from Russia, who remarked on the cleanliness and comfort, noting the good quality of breakfast as well.

In terms of location, the property receives favorable reviews, being conveniently situated near Tampa’s major attractions. Within a practical distance from the University of South Florida and Amalie Arena, it provides easy access to areas of interest whether for leisure or business.

There have been mixed reviews about the breakfast offerings, with some guests finding certain items lacking. However, the overall sentiment suggests a satisfactory start to the day with options provided.

Parking is available on-site at no additional cost, which adds significant value for guests traveling by car. The hotel’s accessibility is further enhanced as it accommodates pets, aligning with its family-friendly profile.

The property scores well in various categories, such as cleanliness, comfort, and customer service, receiving an overall rating of 8.2 out of 10 from 583 reviews. Guests have positively noted the hotel’s quiet environment despite its proximity to popular sites.

For visitors seeking a blend of convenience, comfort, and reasonable pricing in Tampa, the Extended Stay America Premier Suites represents a viable choice. With favorable reviews and a strategic location, it stands out as a practical option for both short and extended stays.

Source: Booking.com

Directions to Extended Stay America Premier Suites – Tampa – Fairgrounds – Casino