Review of Hyatt House Tampa Airport Westshore

Located just 2.7 miles from the Raymond James Stadium, the Hyatt House Tampa Airport/Westshore offers a mix of convenience and comfort in Tampa. With a notable rating of 9.0 out of 10 from guests, this hotel has quickly become a preferred choice for travelers adjusting to the bustling Tampa scene.

The Hyatt House Tampa Airport/Westshore is commended for its excellent location, receiving a 9.2 rating from guests satisfied with its proximity to the airport and other local attractions. The hotel offers convenient amenities, including a free airport shuttle, private parking, and free WiFi, which is accessible throughout the property.

Guests have praised the rooms at Hyatt House for their cleanliness and comfort. Each room is equipped with essential amenities such as air conditioning and a private bathroom, ensuring guests have a pleasant stay. The availability of kitchen facilities in several room types, including a microwave and refrigerator, adds to the convenience, especially for those planning a longer visit.

The hotel provides a fitness center and an outdoor swimming pool, open year-round and catering to guests of all ages. While some guests noted limited availability at the pool, the overall response to the facilities has been positive, with a score of 9.3 for facilities.

The staff at Hyatt House Tampa Airport/Westshore consistently receive high marks for their friendly and accommodating service. As one guest quoted, the “staff was excellent,” highlighting the attentive approach towards the guests. The breakfast receives mixed reviews, being lauded for its selection, although some guests expressed a desire for greater variety. Nevertheless, its quality earns a respectable score from the patrons.

Hyatt House is also appreciated for being pet-friendly, allowing guests to bring their pets upon request. This feature, coupled with spacious and modern rooms, appeals to those traveling with pets.

The hotel’s proximity to major Tampa attractions, such as Amalie Arena, the 1-800 Ask Gary Amphitheatre, and Busch Gardens, makes it an ideal location for both leisure and business travelers. Guests find added benefit in the business center and meeting facilities available at the property, which cater to business needs efficiently.

Overall, Hyatt House Tampa Airport/Westshore delivers a satisfying experience to its guests, combining modern amenities with a welcoming environment. Its reputation as a reliable accommodation option is further solidified by positive feedback and a willingness by guests to return.

For visitors to Tampa, Hyatt House Tampa Airport/Westshore offers a blend of comfort and convenience that caters well to varied needs of travelers. Its strategic location, combined with excellent service and facilities, ensures a remarkably satisfying stay, making it a top-tier choice for anyone visiting the area.

Directions to Hyatt House Tampa Airport / Westshore

Source: Booking.com