Three Hospitalized Following Shooting in Tampa

Late Thursday evening, a violent incident occurred on East Sitka Street, Tampa, resulting in three men being hospitalized.

The Tampa Police Department responded to a shooting that took place around 9:30 p.m., where the victims suffered from significant upper body injuries. The exact circumstances that led to this tragic event are currently unclear, and no statements regarding the victims’ medical conditions have been released at this time.

The incident is considered an active investigation as authorities work to uncover further details. So far, no suspects have been apprehended, and the police have urged anyone with information to come forward by contacting the Tampa Police Department at (813) 231-6130.

Community members in the area express growing concern over the rise in violent crimes, particularly around neighborhoods like East Sitka Street. Despite the ongoing efforts by law enforcement to maintain safety, residents are urged to remain vigilant while the investigation continues.

As the investigation unfolds, authorities will continue working to piece together the events leading up to the shooting. Community cooperation remains essential in assisting law enforcement in resolving this case.

Source: Fox13news